= InfiniTime

image::doc/logo/infinitime-logo-small.jpg[InfiniTime Logo]

A unofiicial fork of the fast open-source firmware for the https://www.pine64.org/pinetime[PineTime smartwatch] with many features, written in modern C++.

This repository is for pesonal use and modified to my liking. Contributions should go to the https://github.com/InfiniTimeOrg/InfiniTime[official repository]. You will find more information on the project there, too.

== Build, flash and debug

- [InfiniTime simulator](https://github.com/InfiniTimeOrg/InfiniSim)
- [Build the project](doc/buildAndProgram.md)
- [Build the project with Docker](doc/buildWithDocker.md)
- [Build the project with VSCode](doc/buildWithVScode.md)
- [Flash the firmware using OpenOCD and STLinkV2](doc/openOCD.md)
- [Flash the firmware using SWD interface](doc/SWD.md)
- [Flash the firmware using JLink](doc/jlink.md)
- [Flash the firmware using GDB](doc/gdb.md)
- [Stub using NRF52-DK](doc/PinetimeStubWithNrf52DK.md)

== Architecture and technical topics

- [BLE implementation and API](doc/ble.md)
- [Memory analysis](doc/MemoryAnalysis.md)

== Licenses

This project is released under the GNU General Public License version 3 or, at your option, any later version.

It integrates the following projects:

- RTOS : **[FreeRTOS](https://freertos.org)** under the MIT license
- UI : **[LittleVGL/LVGL](https://lvgl.io/)** under the MIT license
- BLE stack : **[NimBLE](https://github.com/apache/mynewt-nimble)** under the Apache 2.0 license
- Font : **[Jetbrains Mono](https://www.jetbrains.com/fr-fr/lp/mono/)** under the Apache 2.0 license

