= Nakagin Capsule Tower

This repo is a reversioned minimal TypeScript viewer of a 3D-Model of the Nakagin Capsule Tower using three.js.
Once compiled, the project yields an HTML file. Which when opened in a Browser runs a script that loads and views the attached 3D-Model.

NOTE: This is an meant to be an archive! The code was not maintained since April 2021.

